By: Paul Murphy

In reply to Paul Murphy.

It is still not working.

Double down. Triple down. Quadruple down. Quintuple down. It does not change things. Repeating things that are false does not make them true.

Failure to winterize wind turbines, gas facilities, coal facilities and even nuclear facilities – not the mix of power sources – was the cause of the disaster. That, and the absurd idea of avoiding basic regulation by keeping Texas off the national grid.

LikeLiked by 1 person